Axon 30 Ultra to feature razor-thin frame, 4,600mAh battery

Axon 30 Ultra to feature razor-thin frame, 4,600mAh battery

In yet another teaser for the Axon 30 Ultra ZTE president revealed a couple more interesting details about the handset. A 4,600mAh battery will power up the phone and we got a couple more details about its body.

ZTE’s flagship will come with large cooling surface while achieving an impressive 8mm overall thickness and a metal frame that measures just 1.7mm.

Additionally, the device will weight just 188g, which for a 6.9-inch display is pretty darn impressive.

Source (in Chinese)